/* ARM FPU variants.
   Copyright (C) 1991-2015 Free Software Foundation, Inc.

   This file is part of GCC.

   GCC is free software; you can redistribute it and/or modify it
   under the terms of the GNU General Public License as published
   by the Free Software Foundation; either version 3, or (at your
   option) any later version.

   GCC is distributed in the hope that it will be useful, but WITHOUT
   ANY WARRANTY; without even the implied warranty of MERCHANTABILITY
   or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public
   License for more details.

   You should have received a copy of the GNU General Public License
   along with GCC; see the file COPYING3.  If not see
   <http://www.gnu.org/licenses/>.  */

/* Before using #include to read this file, define a macro:

      ARM_FPU(NAME, MODEL, REV, VFP_REGS, NEON, FP16, CRYPTO)

   The arguments are the fields of struct arm_fpu_desc.

   genopt.sh assumes no whitespace up to the first "," in each entry.  */

ARM_FPU("vfp",		ARM_FP_MODEL_VFP, 2, VFP_REG_D16, false, false, false)
ARM_FPU("vfpv3",	ARM_FP_MODEL_VFP, 3, VFP_REG_D32, false, false, false)
ARM_FPU("vfpv3-fp16",	ARM_FP_MODEL_VFP, 3, VFP_REG_D32, false, true, false)
ARM_FPU("vfpv3-d16",	ARM_FP_MODEL_VFP, 3, VFP_REG_D16, false, false, false)
ARM_FPU("vfpv3-d16-fp16",	ARM_FP_MODEL_VFP, 3, VFP_REG_D16, false, true, false)
ARM_FPU("vfpv3xd",	ARM_FP_MODEL_VFP, 3, VFP_REG_SINGLE, false, false, false)
ARM_FPU("vfpv3xd-fp16",	ARM_FP_MODEL_VFP, 3, VFP_REG_SINGLE, false, true, false)
ARM_FPU("neon",		ARM_FP_MODEL_VFP, 3, VFP_REG_D32, true , false, false)
ARM_FPU("neon-fp16",	ARM_FP_MODEL_VFP, 3, VFP_REG_D32, true, true, false)
ARM_FPU("vfpv4",	ARM_FP_MODEL_VFP, 4, VFP_REG_D32, false, true, false)
ARM_FPU("vfpv4-d16",	ARM_FP_MODEL_VFP, 4, VFP_REG_D16, false, true, false)
ARM_FPU("fpv4-sp-d16",	ARM_FP_MODEL_VFP, 4, VFP_REG_SINGLE, false, true, false)
ARM_FPU("fpv5-sp-d16",	ARM_FP_MODEL_VFP, 5, VFP_REG_SINGLE, false, true, false)
ARM_FPU("fpv5-d16",	ARM_FP_MODEL_VFP, 5, VFP_REG_D16, false, true, false)
ARM_FPU("neon-vfpv4",	ARM_FP_MODEL_VFP, 4, VFP_REG_D32, true, true, false)
ARM_FPU("fp-armv8",	ARM_FP_MODEL_VFP, 8, VFP_REG_D32, false, true, false)
ARM_FPU("neon-fp-armv8",ARM_FP_MODEL_VFP, 8, VFP_REG_D32, true, true, false)
ARM_FPU("crypto-neon-fp-armv8",
			ARM_FP_MODEL_VFP, 8, VFP_REG_D32, true, true, true)
/* Compatibility aliases.  */
ARM_FPU("vfp3",		ARM_FP_MODEL_VFP, 3, VFP_REG_D32, false, false, false)
