/* Definitions of target machine for GNU compiler, for the pdp-11
   Copyright (C) 2002-2016 Free Software Foundation, Inc.
   Contributed by Michael K. Gschwind (mike@vlsivie.tuwien.ac.at).

This file is part of GCC.

GCC is free software; you can redistribute it and/or modify
it under the terms of the GNU General Public License as published by
the Free Software Foundation; either version 3, or (at your option)
any later version.

GCC is distributed in the hope that it will be useful,
but WITHOUT ANY WARRANTY; without even the implied warranty of
MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
GNU General Public License for more details.

You should have received a copy of the GNU General Public License
along with GCC; see the file COPYING3.  If not see
<http://www.gnu.org/licenses/>.  */

/* Add any extra modes needed to represent the condition code.
   CCFPmode is used for FPU, but should we use a separate reg? */

CC_MODE (CCFP);
RESET_FLOAT_FORMAT (SF, pdp11_f_format);
RESET_FLOAT_FORMAT (DF, pdp11_d_format);
