/* This file contains the definitions and documentation for the
   Offloading and Multi Processing builtins used in the GNU compiler.
   Copyright (C) 2005-2017 Free Software Foundation, Inc.

This file is part of GCC.

GCC is free software; you can redistribute it and/or modify it under
the terms of the GNU General Public License as published by the Free
Software Foundation; either version 3, or (at your option) any later
version.

GCC is distributed in the hope that it will be useful, but WITHOUT ANY
WARRANTY; without even the implied warranty of MERCHANTABILITY or
FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public License
for more details.

You should have received a copy of the GNU General Public License
along with GCC; see the file COPYING3.  If not see
<http://www.gnu.org/licenses/>.  */

/* Before including this file, you should define a macro:

     DEF_HSA_BUILTIN (ENUM, NAME, TYPE, ATTRS)

   See builtins.def for details.  */

/* The reason why they aren't in gcc/builtins.def is that the Fortran front end
   doesn't source those.  */

DEF_HSA_BUILTIN (BUILT_IN_HSA_WORKGROUPID, "hsa_workgroupid",
	  	 BT_FN_UINT_UINT, ATTR_CONST_NOTHROW_LEAF_LIST)
DEF_HSA_BUILTIN (BUILT_IN_HSA_WORKITEMID, "hsa_workitemid",
	  	 BT_FN_UINT_UINT, ATTR_CONST_NOTHROW_LEAF_LIST)
DEF_HSA_BUILTIN (BUILT_IN_HSA_WORKITEMABSID, "hsa_workitemabsid",
	  	 BT_FN_UINT_UINT, ATTR_CONST_NOTHROW_LEAF_LIST)
DEF_HSA_BUILTIN (BUILT_IN_HSA_GRIDSIZE, "hsa_gridsize",
		 BT_FN_UINT_UINT, ATTR_CONST_NOTHROW_LEAF_LIST)
DEF_HSA_BUILTIN (BUILT_IN_HSA_CURRENTWORKGROUPSIZE, "hsa_currentworkgroupsize",
		 BT_FN_UINT_UINT, ATTR_CONST_NOTHROW_LEAF_LIST)
