//===--- Sanitizers.def - Runtime sanitizer options -------------*- C++ -*-===//
//
//                     The LLVM Compiler Infrastructure
//
// This file is distributed under the University of Illinois Open Source
// License. See LICENSE.TXT for details.
//
//===----------------------------------------------------------------------===//
//
// This file defines the options for specifying which runtime sanitizers to
// enable. Users of this file must define the SANITIZER macro to make use of
// this information. Users of this file can also define the SANITIZER_GROUP
// macro to get information on options which refer to sets of sanitizers.
//
//===----------------------------------------------------------------------===//

#ifndef SANITIZER
#error "Define SANITIZER prior to including this file!"
#endif

// SANITIZER(NAME, ID)

// The first value is the name of the sanitizer as a string. The sanitizer can
// be enabled by specifying -fsanitize=NAME.

// The second value is an identifier which can be used to refer to the
// sanitizer.


// SANITIZER_GROUP(NAME, ID, ALIAS)

// The first two values have the same semantics as the corresponding SANITIZER
// values. The third value is an expression ORing together the IDs of individual
// sanitizers in this group.

#ifndef SANITIZER_GROUP
#define SANITIZER_GROUP(NAME, ID, ALIAS)
#endif


// AddressSanitizer
SANITIZER("address", Address)

// Kernel AddressSanitizer (KASan)
SANITIZER("kernel-address", KernelAddress)

// MemorySanitizer
SANITIZER("memory", Memory)

// libFuzzer
SANITIZER("fuzzer", Fuzzer)

// ThreadSanitizer
SANITIZER("thread", Thread)

// LeakSanitizer
SANITIZER("leak", Leak)

// UndefinedBehaviorSanitizer
SANITIZER("alignment", Alignment)
SANITIZER("array-bounds", ArrayBounds)
SANITIZER("bool", Bool)
SANITIZER("enum", Enum)
SANITIZER("float-cast-overflow", FloatCastOverflow)
SANITIZER("float-divide-by-zero", FloatDivideByZero)
SANITIZER("function", Function)
SANITIZER("integer-divide-by-zero", IntegerDivideByZero)
SANITIZER("nonnull-attribute", NonnullAttribute)
SANITIZER("null", Null)
SANITIZER("nullability-arg", NullabilityArg)
SANITIZER("nullability-assign", NullabilityAssign)
SANITIZER("nullability-return", NullabilityReturn)
SANITIZER_GROUP("nullability", Nullability,
                NullabilityArg | NullabilityAssign | NullabilityReturn)
SANITIZER("object-size", ObjectSize)
SANITIZER("pointer-overflow", PointerOverflow)
SANITIZER("return", Return)
SANITIZER("returns-nonnull-attribute", ReturnsNonnullAttribute)
SANITIZER("shift-base", ShiftBase)
SANITIZER("shift-exponent", ShiftExponent)
SANITIZER_GROUP("shift", Shift, ShiftBase | ShiftExponent)
SANITIZER("signed-integer-overflow", SignedIntegerOverflow)
SANITIZER("unreachable", Unreachable)
SANITIZER("vla-bound", VLABound)
SANITIZER("vptr", Vptr)

// IntegerSanitizer
SANITIZER("unsigned-integer-overflow", UnsignedIntegerOverflow)

// DataFlowSanitizer
SANITIZER("dataflow", DataFlow)

// Control Flow Integrity
SANITIZER("cfi-cast-strict", CFICastStrict)
SANITIZER("cfi-derived-cast", CFIDerivedCast)
SANITIZER("cfi-icall", CFIICall)
SANITIZER("cfi-unrelated-cast", CFIUnrelatedCast)
SANITIZER("cfi-nvcall", CFINVCall)
SANITIZER("cfi-vcall", CFIVCall)
SANITIZER_GROUP("cfi", CFI,
                CFIDerivedCast | CFIICall | CFIUnrelatedCast | CFINVCall |
                CFIVCall)

// Safe Stack
SANITIZER("safe-stack", SafeStack)

// -fsanitize=undefined includes all the sanitizers which have low overhead, no
// ABI or address space layout implications, and only catch undefined behavior.
SANITIZER_GROUP("undefined", Undefined,
                Alignment | Bool | ArrayBounds | Enum | FloatCastOverflow |
                    FloatDivideByZero | IntegerDivideByZero | NonnullAttribute |
                    Null | ObjectSize | PointerOverflow | Return |
                    ReturnsNonnullAttribute | Shift | SignedIntegerOverflow |
                    Unreachable | VLABound | Function | Vptr)

// -fsanitize=undefined-trap is an alias for -fsanitize=undefined.
SANITIZER_GROUP("undefined-trap", UndefinedTrap, Undefined)

SANITIZER_GROUP("integer", Integer,
                SignedIntegerOverflow | UnsignedIntegerOverflow | Shift |
                IntegerDivideByZero)

SANITIZER("local-bounds", LocalBounds)
SANITIZER_GROUP("bounds", Bounds, ArrayBounds | LocalBounds)

// EfficiencySanitizer
SANITIZER("efficiency-cache-frag", EfficiencyCacheFrag)
SANITIZER("efficiency-working-set", EfficiencyWorkingSet)
// Meta-group only used internally.
SANITIZER_GROUP("efficiency-all", Efficiency,
                EfficiencyCacheFrag | EfficiencyWorkingSet)

// Magic group, containing all sanitizers. For example, "-fno-sanitize=all"
// can be used to disable all the sanitizers.
SANITIZER_GROUP("all", All, ~0ULL)

#undef SANITIZER
#undef SANITIZER_GROUP
