//===- ThreadSafetyTIL.h ---------------------------------------*- C++ --*-===//
//
//                     The LLVM Compiler Infrastructure
//
// This file is distributed under the University of Illinois Open Source
// License. See LICENSE.TXT for details.
//
//===----------------------------------------------------------------------===//
//
// This file defines the list of core opcodes for the Thread Safety
// Typed Intermediate language.  Please see ThreadSafetyTIL.h for more
// information.
//
//===----------------------------------------------------------------------===//


TIL_OPCODE_DEF(Future)
TIL_OPCODE_DEF(Undefined)
TIL_OPCODE_DEF(Wildcard)

TIL_OPCODE_DEF(Literal)
TIL_OPCODE_DEF(LiteralPtr)
TIL_OPCODE_DEF(Variable)
TIL_OPCODE_DEF(Function)
TIL_OPCODE_DEF(SFunction)
TIL_OPCODE_DEF(Code)
TIL_OPCODE_DEF(Field)

TIL_OPCODE_DEF(Apply)
TIL_OPCODE_DEF(SApply)
TIL_OPCODE_DEF(Project)

TIL_OPCODE_DEF(Call)
TIL_OPCODE_DEF(Alloc)
TIL_OPCODE_DEF(Load)
TIL_OPCODE_DEF(Store)
TIL_OPCODE_DEF(ArrayIndex)
TIL_OPCODE_DEF(ArrayAdd)

TIL_OPCODE_DEF(UnaryOp)
TIL_OPCODE_DEF(BinaryOp)
TIL_OPCODE_DEF(Cast)

TIL_OPCODE_DEF(SCFG)
TIL_OPCODE_DEF(BasicBlock)
TIL_OPCODE_DEF(Phi)

// Terminator instructions
TIL_OPCODE_DEF(Goto)
TIL_OPCODE_DEF(Branch)
TIL_OPCODE_DEF(Return)

// pseudo-terms
TIL_OPCODE_DEF(Identifier)
TIL_OPCODE_DEF(IfThenElse)
TIL_OPCODE_DEF(Let)

